2 2.5 3 3.5 4 4.5 5 )^2c

(GeV/ μμm

1

10

210

310

2c Counts per 50 MeV/

= 5.02 TeV s ALICE, pp

100 − = 49 trk corr N 11 ± = 71 raw ψJ/ N 2c 1 MeV/ ± = 3097 ψJ/μ 2c 1 MeV/ ± = 68 ψJ/σ

Data

signal ψJ/ (2S) signal ψ Background Signal+background

ALI-PUB-530568

ALI-PUB-530568